-0.4 -0.3 -0.2 -0.1 -0 0.1 0.2 0.3 0.4 0 10 20 30 40 50 60 70 80 zxvertex id=6 g7 Entries 1567 Mean 0.0001402 RMS 0.145 zxvertex id=6

-0.4 -0.3 -0.2 -0.1 -0 0.1 0.2 0.3 0.4 0 10 20 30 40 50 60 70 80 zyvertex id=6 g8 Entries 1567 Mean -0.00144 RMS 0.1535 zyvertex id=6

-1 -0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1 0

50

100

150

200

250 si dphi deg id=5 g16 Entries 1618 Mean 0.1042 RMS 0.09133 si dphi deg id=5

-1 -0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1 0

50

100

150

200

250 si dphi deg id=6 g17 Entries 1567 Mean -0.1785 RMS 0.09598 si dphi deg id=6

-5 -4 -3 -2 -1 0 1 2 3 4 5 0 50 100 150 200 250 300 350 400 si dphi*pz degGeV g18 Entries 3185 Mean -0.178 RMS 0.745 si dphi*pz degGeV

-0.05 0 0.05 0.1 0.15 0.2 0 100 200 300 400 500 600 700 800 rintercept g19 Entries 3185 Mean 5.977e-05 RMS 0.009372 rintercept