-80 -60 -40 -20 0 20 40 60 80 -80 -60 -40 -20 0 20 40 60 80 hZVertexMvdBbc Nent = 7934 Mean x = -0.527 Mean y = 2.367 RMS x = 13.46 RMS y = 41.61

hZVertexMvdBbc_{hZVertexMvdBbc}