kapton cable length (mm)

60 80 100 120 140 160 180 200 noise (width of pedestal)

2 4 6 8 10 12 14 16 18 20 22 MVD west noise

2 4 6 8

2 4 6 8

2 4 6 8

2 4 6 8

2 4 6 8