10–56 CHAPTER 10. MUON ARM

Table 10.8: Cost Estimate for the PHENIX Muon Arm

individual planes of the muon identifier may be prepared independently of other activities in the major facility hall, but their installation into the gaps in the downstream absorber requires that the stackable shield wall which encloses the side of the detector closer to the center of the RHIC ring be removed locally, thus requiring a dedicated shutdown period when the shielding may be opened.

10.6. SCHEDULE 10–57

Figure 10.41: Overall schedule for the PHENIX muon arm.

Bibliography

[1] R. Vogt, Atom. Nucl. Data Tabl. 50, 343 (1992). [2] N. S. Craigie, Phys. Rep. 47,1 (1978).

[3] G. P. Yost et al., “A Guide to Data in Elementary Particle Physics”, LBL-90 revised, UC-34D (1986) and references contained therein.

[4] Review of Particle Properties, Phys. Lett. B204, 1 (1988). [5] C. Gerschel and J. Hufner. Nucl. Phys. A544, 513c (1992).

[6] H. Wind, “Principal Component Analysis and its application to track finding”, In Formula and Methods in Experimental Data Evaluation, Vol. 3, European Physical Society, 1984 [7] D. Bortoletto et al., Nucl. Inst. and Methods A320, 114 (1992). [8] B. Müller and X.-N. Wang, Phys. Rev. Lett. 68, 2437 (1992); E. Shuryak, SUNY-NTG- 91-48 (1991).

[9] M. Leitch, E789 collaboration, private communication. [10] A. Chilingarov et al., Phys. Lett. 83B, 136 (1979). [11] K. Kodama et al., Phys. Lett. 263B, 579 (1991).

[12] C. Conta et al., UA2 Collaboration, Nucl. Instr. Meth. 224, 65-74 (1984).

10–58

Contents

10 Muon Arm 10{1 10.1 Overview : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : 10–1 10.1.1 Acceptance and Coverage : : : : : : : : : : : : : : : : : : : : : : : : 10–4 10.2 Layout and Mechanical : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : 10–11 10.2.1 Interface to Magnet : : : : : : : : : : : : : : : : : : : : : : : : : : : : 10–11 10.2.2 Specialized Absorber Sections : : : : : : : : : : : : : : : : : : : : : : 10–11 10.2.3 Muon Arm Tracking Chambers : : : : : : : : : : : : : : : : : : : : : 10–13 10.2.4 Muon Identifier : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : 10–18 10.3 Electronics : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : 10–22 10.3.1 Front-end : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : 10–22 10.3.2 Trigger : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : 10–27 10.4 Performance and Backgrounds : : : : : : : : : : : : : : : : : : : : : : : : : : 10–28 10.4.1 Absorber : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : 10–28 10.4.2 Tracking and Spectrometer : : : : : : : : : : : : : : : : : : : : : : : : 10–34 10.4.3 Muon Identifier : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : 10–40 10.4.4 Integrated Performance : : : : : : : : : : : : : : : : : : : : : : : : : : 10–44 10.4.5 Muon–Electron Coincidence Measurements : : : : : : : : : : : : : : : 10–52 10.5 Cost : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : 10–55 10.6 Schedule : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : 10–55

10–59