0 50 100 150 200

0 2.5 5 7.5 10

Hadron freeze-out temperature

158AGeV/c Pb + Pb 0 50 100 150 200

0 2.5 5 7.5 10

τ (fm/c)

T (MeV)

200AGeV/c S + S

RQMD - H. Sorge, Phys. Lett. B, in press.

I.Ya. Pomeranchuk, Dokl. Akad. Sci. USSR, 78, 884(1951). L.D. Landau, Izv. Akad. Nauk., SSSR Ser. Fiz., 17, 51(1953).

(1) T_c ~ μc^2 = 140MeV, μ = m_π (2) particle density determined at the freeze-out stage.

/p2hp7/usr2/xu/tex/talk/qm96/qm96pl_50.kumac