0.1

0.15

0.2

0.25

0.3

0.35

0 0.25 0.5 0.75 1 1.25 p+p S+S

Pb+Pb

Pion^- Kaon^- Anti-Proton

mass (GeV)

Slope Parameter T (GeV)

NA44 Preliminary