158AGeV/c Pb + Pb 5 protons

0

20

40

60

80

-1 0 1 2 3 4 5 6 7

Lund

RQMD

NA44 preliminary data

Laboratory rapidity

Proton dN/dy

NA44 PRELIMINARY 160AGeV/c Pb + Pb 5 proton XUp2hp7/usr2/xu/tex/talk/qm96/qm96pl_17.kumac