NA44 Spectrometer Acceptance

0

0.5

1

1.5

2

1 2 3 4 5

Pions Kaons Protons Deuterons

4GeV/c

0

0.5

1

1.5

2

1 2 3 4 5

8GeV/c

p_T (GeV/c)

Laboratory Rapidity

XU/users/xu/94data/proton/acc.kumac 02-10-96