0 10 20 30 40 50 1.6

1.8

2

2.2

2.4

2.6

2.8 Station-2 Octant-1 Rms vrs Day

0 10 20 30 40 50 2

4

6

8

10 Station-2 Octant-2 Rms vrs Day

0 10 20 30 40 50 1.7 1.75 1.8 1.85 1.9 1.95 2 2.05 2.1 Station-2 Octant-3 Rms vrs Day

0 10 20 30 40 50 2 3

4 5

6 7

8 Station-2 Octant-4 Rms vrs Day

0 10 20 30 40 50 1.9

2

2.1

2.2

2.3

2.4 Station-2 Octant-5 Rms vrs Day

0 10 20 30 40 50 2 2.5 3 3.5 4 4.5 5

Station-2 Octant-6 Rms vrs Day

0 10 20 30 40 50 1.9

2

2.1

2.2

2.3

2.4 Station-2 Octant-7 Rms vrs Day

0 10 20 30 40 50

1.65

1.7

1.75

1.8

1.85

1.9

1.95

Station-2 Octant-8 Rms vrs Day