-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-0_{drmsHist_s1o0}

Nent = 1085 Mean = 0.06707 RMS = 0.2445 Under = 0 Over = 0 Integ = 1085

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-1_{drmsHist_s1o1}

Nent = 1130 Mean = -0.01775 RMS = 0.12 Under = 0 Over = 0 Integ = 1130

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-2_{drmsHist_s1o2}

Nent = 1104 Mean = -0.04874 RMS = 0.1836 Under = 0 Over = 0 Integ = 1104

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-3_{drmsHist_s1o3}

Nent = 1093 Mean = -0.2243 RMS = 0.2583 Under = 0 Over = 0 Integ = 1093

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-4_{drmsHist_s1o4}

Nent = 1064 Mean = 0.003535 RMS = 0.1249 Under = 0 Over = 0 Integ = 1064

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-5_{drmsHist_s1o5}

Nent = 1132 Mean = -0.00347 RMS = 0.1224 Under = 0 Over = 0 Integ = 1132

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-6_{drmsHist_s1o6}

Nent = 1100 Mean = 0.02478 RMS = 0.1284 Under = 0 Over = 0 Integ = 1100

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-7_{drmsHist_s1o7}

Nent = 1075 Mean = 0.004617 RMS = 0.121 Under = 0 Over = 0 Integ = 1075