-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-0_{dpedHist_s2o0}

Nent = 1264 Mean = -0.01641 RMS = 0.4929 Under = 0 Over = 0 Integ = 1264

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-1_{dpedHist_s2o1}

Nent = 1255 Mean = -0.2612 RMS = 0.6155 Under = 0 Over = 0 Integ = 1255

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-2_{dpedHist_s2o2}

Nent = 1269 Mean = -0.006813 RMS = 0.6728 Under = 0 Over = 0 Integ = 1269

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-3_{dpedHist_s2o3}

Nent = 1266 Mean = 0.7034 RMS = 1.015 Under = 0 Over = 0 Integ = 1266

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-4_{dpedHist_s2o4}

Nent = 1266 Mean = 0.0363 RMS = 0.5165 Under = 0 Over = 0 Integ = 1266

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-5_{dpedHist_s2o5}

Nent = 1261 Mean = 0.3601 RMS = 0.5472 Under = 0 Over = 0 Integ = 1261

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-6_{dpedHist_s2o6}

Nent = 1266 Mean = -0.2296 RMS = 0.5266 Under = 0 Over = 0 Integ = 1266

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-7_{dpedHist_s2o7}

Nent = 1261 Mean = 0.4419 RMS = 0.5736 Under = 0 Over = 0 Integ = 1261