-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-0_{drmsHist_s2o0}

Nent = 954 Mean = 0.07694 RMS = 0.3274 Under = 0 Over = 0 Integ = 954

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-1_{drmsHist_s2o1}

Nent = 951 Mean = 0.1283 RMS = 0.2511 Under = 0 Over = 0 Integ = 951

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-2_{drmsHist_s2o2}

Nent = 957 Mean = -9.623e-05 RMS = 0.3227 Under = 1 Over = 0 Integ = 956

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-3_{drmsHist_s2o3}

Nent = 959 Mean = -0.05176 RMS = 0.2138 Under = 0 Over = 0 Integ = 959

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-4_{drmsHist_s2o4}

Nent = 956 Mean = 0.0664 RMS = 0.4134 Under = 0 Over = 0 Integ = 956

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-5_{drmsHist_s2o5}

Nent = 958 Mean = 0.06391 RMS = 0.1966 Under = 0 Over = 0 Integ = 958

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-6_{drmsHist_s2o6}

Nent = 956 Mean = -0.09317 RMS = 0.2653 Under = 0 Over = 0 Integ = 956

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-7_{drmsHist_s2o7}

Nent = 954 Mean = -0.1283 RMS = 0.2776 Under = 0 Over = 0 Integ = 954