-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-0_{drmsHist_s2o0}

Nent = 953 Mean = 0.02857 RMS = 0.3467 Under = 0 Over = 0 Integ = 953

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-1_{drmsHist_s2o1}

Nent = 957 Mean = 0.06093 RMS = 0.2032 Under = 0 Over = 3 Integ = 954

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-2_{drmsHist_s2o2}

Nent = 957 Mean = 0.07678 RMS = 0.3294 Under = 0 Over = 4 Integ = 953

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-3_{drmsHist_s2o3}

Nent = 960 Mean = 0.223 RMS = 0.4843 Under = 0 Over = 9 Integ = 951

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-4_{drmsHist_s2o4}

Nent = 956 Mean = 0.04244 RMS = 0.2668 Under = 0 Over = 15 Integ = 941

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-5_{drmsHist_s2o5}

Nent = 958 Mean = 0.01373 RMS = 0.2537 Under = 0 Over = 2 Integ = 956

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-6_{drmsHist_s2o6}

Nent = 957 Mean = 0.08276 RMS = 0.2618 Under = 0 Over = 7 Integ = 950

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-7_{drmsHist_s2o7}

Nent = 953 Mean = 0.08357 RMS = 0.2059 Under = 0 Over = 1 Integ = 952