-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-0_{drmsHist_s2o0}

Nent = 953 Mean = 0.003294 RMS = 0.1957 Under = 48 Over = 0 Integ = 905

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-1_{drmsHist_s2o1}

Nent = 957 Mean = -0.04973 RMS = 0.1682 Under = 0 Over = 0 Integ = 957

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-2_{drmsHist_s2o2}

Nent = 957 Mean = -0.06136 RMS = 0.2329 Under = 0 Over = 0 Integ = 957

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-3_{drmsHist_s2o3}

Nent = 960 Mean = -0.08083 RMS = 0.2023 Under = 0 Over = 0 Integ = 960

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-4_{drmsHist_s2o4}

Nent = 956 Mean = 0.002495 RMS = 0.1643 Under = 0 Over = 0 Integ = 956

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-5_{drmsHist_s2o5}

Nent = 958 Mean = 0.01259 RMS = 0.1395 Under = 0 Over = 0 Integ = 958

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-6_{drmsHist_s2o6}

Nent = 956 Mean = -0.11 RMS = 0.2175 Under = 0 Over = 0 Integ = 956

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-7_{drmsHist_s2o7}

Nent = 953 Mean = 0.001441 RMS = 0.1527 Under = 0 Over = 0 Integ = 953