-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-0_{dpedHist_s1o0}

Nent = 925 Mean = 0.1517 RMS = 0.4025 Under = 0 Over = 0 Integ = 925

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-1_{dpedHist_s1o1}

Nent = 951 Mean = -0.2119 RMS = 1.354 Under = 14 Over = 0 Integ = 937

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-2_{dpedHist_s1o2}

Nent = 938 Mean = -0.1938 RMS = 0.3793 Under = 0 Over = 0 Integ = 938

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-3_{dpedHist_s1o3}

Nent = 950 Mean = -0.1401 RMS = 0.4061 Under = 0 Over = 0 Integ = 950

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-4_{dpedHist_s1o4}

Nent = 890 Mean = 0.02991 RMS = 0.4736 Under = 0 Over = 0 Integ = 890

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-5_{dpedHist_s1o5}

Nent = 946 Mean = -0.05349 RMS = 0.3264 Under = 0 Over = 0 Integ = 946

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-6_{dpedHist_s1o6}

Nent = 938 Mean = -0.3023 RMS = 0.4657 Under = 0 Over = 0 Integ = 938

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-7_{dpedHist_s1o7}

Nent = 956 Mean = -0.2874 RMS = 0.4407 Under = 0 Over = 0 Integ = 956