-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-0_{drmsHist_s1o0}

Nent = 925 Mean = -0.1705 RMS = 0.171 Under = 0 Over = 0 Integ = 925

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-1_{drmsHist_s1o1}

Nent = 921 Mean = -0.2172 RMS = 0.7295 Under = 33 Over = 0 Integ = 888

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-2_{drmsHist_s1o2}

Nent = 938 Mean = -0.03011 RMS = 0.1139 Under = 0 Over = 0 Integ = 938

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-3_{drmsHist_s1o3}

Nent = 950 Mean = 0.05206 RMS = 0.1351 Under = 0 Over = 0 Integ = 950

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-4_{drmsHist_s1o4}

Nent = 890 Mean = 0.04166 RMS = 0.1462 Under = 0 Over = 0 Integ = 890

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-5_{drmsHist_s1o5}

Nent = 946 Mean = -0.1314 RMS = 0.1769 Under = 0 Over = 0 Integ = 946

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-6_{drmsHist_s1o6}

Nent = 938 Mean = 0.01846 RMS = 0.143 Under = 0 Over = 0 Integ = 938

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-7_{drmsHist_s1o7}

Nent = 956 Mean = 0.04325 RMS = 0.2937 Under = 0 Over = 0 Integ = 956