-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-0_{drmsHist_s2o0}

Nent = 953 Mean = -0.172 RMS = 0.2097 Under = 0 Over = 0 Integ = 953

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-1_{drmsHist_s2o1}

Nent = 957 Mean = -0.1094 RMS = 0.2215 Under = 0 Over = 0 Integ = 957

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-2_{drmsHist_s2o2}

Nent = 957 Mean = -0.1334 RMS = 0.3107 Under = 0 Over = 0 Integ = 957

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-3_{drmsHist_s2o3}

Nent = 960 Mean = -0.05154 RMS = 0.1568 Under = 0 Over = 0 Integ = 960

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-4_{drmsHist_s2o4}

Nent = 956 Mean = -0.05682 RMS = 0.2293 Under = 0 Over = 0 Integ = 956

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-5_{drmsHist_s2o5}

Nent = 958 Mean = -0.1329 RMS = 0.1874 Under = 0 Over = 0 Integ = 958

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-6_{drmsHist_s2o6}

Nent = 957 Mean = -0.1392 RMS = 0.2162 Under = 0 Over = 0 Integ = 957

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-7_{drmsHist_s2o7}

Nent = 954 Mean = -0.0474 RMS = 0.1797 Under = 0 Over = 0 Integ = 954