-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-0_{dpedHist_s1o0}

Nent = 925 Mean = 0.6699 RMS = 5.209 Under = 0 Over = 2 Integ = 923

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-1_{dpedHist_s1o1}

Nent = 951 Mean = -0.376 RMS = 0.3983 Under = 0 Over = 0 Integ = 951

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-2_{dpedHist_s1o2}

Nent = 938 Mean = -0.1204 RMS = 0.4862 Under = 0 Over = 0 Integ = 938

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-3_{dpedHist_s1o3}

Nent = 950 Mean = -0.3041 RMS = 0.3207 Under = 0 Over = 0 Integ = 950

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-4_{dpedHist_s1o4}

Nent = 890 Mean = -0.2535 RMS = 0.4206 Under = 0 Over = 0 Integ = 890

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-5_{dpedHist_s1o5}

Nent = 945 Mean = -0.1992 RMS = 0.3472 Under = 0 Over = 0 Integ = 945

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-6_{dpedHist_s1o6}

Nent = 938 Mean = 0.004206 RMS = 0.5417 Under = 0 Over = 0 Integ = 938

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-7_{dpedHist_s1o7}

Nent = 956 Mean = -0.2576 RMS = 0.5696 Under = 0 Over = 0 Integ = 956