-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-0_{drmsHist_s1o0}

Nent = 924 Mean = 0.02993 RMS = 0.1245 Under = 0 Over = 0 Integ = 924

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-1_{drmsHist_s1o1}

Nent = 950 Mean = 0.05375 RMS = 0.1225 Under = 0 Over = 0 Integ = 950

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-2_{drmsHist_s1o2}

Nent = 939 Mean = 0.08303 RMS = 0.1534 Under = 0 Over = 0 Integ = 939

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-3_{drmsHist_s1o3}

Nent = 951 Mean = 0.2369 RMS = 0.1926 Under = 0 Over = 0 Integ = 951

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-4_{drmsHist_s1o4}

Nent = 895 Mean = 0.1205 RMS = 0.1616 Under = 0 Over = 0 Integ = 895

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-5_{drmsHist_s1o5}

Nent = 946 Mean = 0.05333 RMS = 0.2058 Under = 0 Over = 1 Integ = 945

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-6_{drmsHist_s1o6}

Nent = 939 Mean = 0.03169 RMS = 0.1382 Under = 0 Over = 0 Integ = 939

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-7_{drmsHist_s1o7}

Nent = 956 Mean = -0.07928 RMS = 0.1326 Under = 0 Over = 0 Integ = 956