-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-0_{drmsHist_s2o0}

Nent = 954 Mean = 0.1674 RMS = 0.3148 Under = 0 Over = 0 Integ = 954

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-1_{drmsHist_s2o1}

Nent = 951 Mean = 0.1985 RMS = 0.335 Under = 0 Over = 0 Integ = 951

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-2_{drmsHist_s2o2}

Nent = 957 Mean = 0.2643 RMS = 0.4513 Under = 4 Over = 0 Integ = 953

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-3_{drmsHist_s2o3}

Nent = 959 Mean = -0.04609 RMS = 0.1852 Under = 0 Over = 0 Integ = 959

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-4_{drmsHist_s2o4}

Nent = 956 Mean = -0.02076 RMS = 0.193 Under = 0 Over = 0 Integ = 956

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-5_{drmsHist_s2o5}

Nent = 958 Mean = 0.09004 RMS = 0.2026 Under = 0 Over = 0 Integ = 958

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-6_{drmsHist_s2o6}

Nent = 956 Mean = -0.02657 RMS = 0.2807 Under = 0 Over = 0 Integ = 956

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-7_{drmsHist_s2o7}

Nent = 954 Mean = -0.06971 RMS = 0.2944 Under = 0 Over = 0 Integ = 954