-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-0_{drmsHist_s1o0}

Nent = 924 Mean = 0.05651 RMS = 0.1669 Under = 0 Over = 0 Integ = 924

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-1_{drmsHist_s1o1}

Nent = 950 Mean = 0.04145 RMS = 0.1842 Under = 0 Over = 0 Integ = 950

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-2_{drmsHist_s1o2}

Nent = 939 Mean = 0.1367 RMS = 0.1982 Under = 0 Over = 0 Integ = 939

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-3_{drmsHist_s1o3}

Nent = 951 Mean = 0.04959 RMS = 0.2294 Under = 0 Over = 0 Integ = 951

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-4_{drmsHist_s1o4}

Nent = 895 Mean = 0.0427 RMS = 0.2065 Under = 0 Over = 0 Integ = 895

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-5_{drmsHist_s1o5}

Nent = 946 Mean = 0.09571 RMS = 0.1884 Under = 0 Over = 0 Integ = 946

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-6_{drmsHist_s1o6}

Nent = 938 Mean = -0.04461 RMS = 0.2004 Under = 0 Over = 0 Integ = 938

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-7_{drmsHist_s1o7}

Nent = 956 Mean = -0.146 RMS = 0.2204 Under = 0 Over = 0 Integ = 956