-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-0_{dpedHist_s1o0}

Nent = 1101 Mean = 0.06355 RMS = 0.3994 Under = 0 Over = 0 Integ = 1101

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-1_{dpedHist_s1o1}

Nent = 1129 Mean = -0.2869 RMS = 0.5335 Under = 0 Over = 0 Integ = 1129

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-2_{dpedHist_s1o2}

Nent = 1109 Mean = 0.4005 RMS = 0.5402 Under = 0 Over = 0 Integ = 1109

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-3_{dpedHist_s1o3}

Nent = 1108 Mean = 0.0927 RMS = 0.428 Under = 0 Over = 0 Integ = 1108

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-4_{dpedHist_s1o4}

Nent = 1083 Mean = 0.1527 RMS = 0.3937 Under = 0 Over = 0 Integ = 1083

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-5_{dpedHist_s1o5}

Nent = 1139 Mean = 0.1141 RMS = 0.3674 Under = 0 Over = 0 Integ = 1139

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-6_{dpedHist_s1o6}

Nent = 1108 Mean = 0.07997 RMS = 0.4951 Under = 0 Over = 0 Integ = 1108

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-7_{dpedHist_s1o7}

Nent = 1109 Mean = 0.01249 RMS = 0.524 Under = 0 Over = 0 Integ = 1109