-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-0_{drmsHist_s1o0}

Nent = 924 Mean = -0.156 RMS = 0.2212 Under = 0 Over = 0 Integ = 924

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-1_{drmsHist_s1o1}

Nent = 949 Mean = 0.0875 RMS = 0.2005 Under = 0 Over = 0 Integ = 949

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-2_{drmsHist_s1o2}

Nent = 938 Mean = 0.1527 RMS = 0.1921 Under = 0 Over = 0 Integ = 938

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-3_{drmsHist_s1o3}

Nent = 951 Mean = 0.08442 RMS = 0.1653 Under = 0 Over = 0 Integ = 951

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-4_{drmsHist_s1o4}

Nent = 893 Mean = -0.09768 RMS = 0.2171 Under = 0 Over = 0 Integ = 893

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-5_{drmsHist_s1o5}

Nent = 945 Mean = -0.03288 RMS = 0.2102 Under = 0 Over = 0 Integ = 945

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-6_{drmsHist_s1o6}

Nent = 938 Mean = -0.0359 RMS = 0.1869 Under = 0 Over = 0 Integ = 938

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-7_{drmsHist_s1o7}

Nent = 955 Mean = -0.07064 RMS = 0.2818 Under = 0 Over = 9 Integ = 946