-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-0_{drmsHist_s1o0}

Nent = 1098 Mean = 0.01389 RMS = 0.2287 Under = 0 Over = 0 Integ = 1098

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-1_{drmsHist_s1o1}

Nent = 1128 Mean = 0.04417 RMS = 0.3097 Under = 0 Over = 0 Integ = 1128

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-2_{drmsHist_s1o2}

Nent = 1107 Mean = 0.1437 RMS = 0.2569 Under = 0 Over = 0 Integ = 1107

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-3_{drmsHist_s1o3}

Nent = 1107 Mean = 0.02123 RMS = 0.2045 Under = 0 Over = 0 Integ = 1107

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-4_{drmsHist_s1o4}

Nent = 1077 Mean = -0.02238 RMS = 0.2234 Under = 0 Over = 0 Integ = 1077

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-5_{drmsHist_s1o5}

Nent = 1136 Mean = 0.03921 RMS = 0.1324 Under = 0 Over = 0 Integ = 1136

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-6_{drmsHist_s1o6}

Nent = 1108 Mean = 0.003238 RMS = 0.1585 Under = 0 Over = 0 Integ = 1108

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-7_{drmsHist_s1o7}

Nent = 1108 Mean = 0.004481 RMS = 0.1391 Under = 0 Over = 0 Integ = 1108