-1 -0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1

1

10

10^2

Fractional Gain Difference for Sta-1 Oct-0_{dgainHist_s1o0}

Nent = 1080 Mean = 0.03467 RMS = 0.1624 Under = 0 Over = 10 Integ = 1070

-1 -0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1

1

10

Fractional Gain Difference for Sta-1 Oct-1_{dgainHist_s1o1}

Nent = 630 Mean = 0.02484 RMS = 0.1602 Under = 0 Over = 7 Integ = 623

-1 -0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1

1

10

10^2

Fractional Gain Difference for Sta-1 Oct-2_{dgainHist_s1o2}

Nent = 1106 Mean = 0.02453 RMS = 0.1455 Under = 0 Over = 4 Integ = 1102

-1 -0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1

1

10

10^2

Fractional Gain Difference for Sta-1 Oct-3_{dgainHist_s1o3}

Nent = 1104 Mean = 0.02726 RMS = 0.3205 Under = 0 Over = 48 Integ = 1056

-1 -0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1

1

10

10^2

Fractional Gain Difference for Sta-1 Oct-4_{dgainHist_s1o4}

Nent = 1066 Mean = 0.01486 RMS = 0.2111 Under = 0 Over = 14 Integ = 1052

-1 -0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1

1

10

10^2

Fractional Gain Difference for Sta-1 Oct-5_{dgainHist_s1o5}

Nent = 1136 Mean = 0.02143 RMS = 0.1308 Under = 0 Over = 5 Integ = 1131

-1 -0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1

1

10

10^2

Fractional Gain Difference for Sta-1 Oct-6_{dgainHist_s1o6}

Nent = 1104 Mean = -0.009911 RMS = 0.1868 Under = 0 Over = 10 Integ = 1094

-1 -0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1

1

10

10^2

Fractional Gain Difference for Sta-1 Oct-7_{dgainHist_s1o7}

Nent = 1107 Mean = 0.01585 RMS = 0.1736 Under = 0 Over = 10 Integ = 1097