-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-0_{dpedHist_s1o0}

Nent = 1079 Mean = 0.05875 RMS = 0.4212 Under = 0 Over = 0 Integ = 1079

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-1_{dpedHist_s1o1}

Nent = 630 Mean = -0.2789 RMS = 0.3946 Under = 0 Over = 0 Integ = 630

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-2_{dpedHist_s1o2}

Nent = 1106 Mean = 0.177 RMS = 0.4275 Under = 0 Over = 0 Integ = 1106

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-3_{dpedHist_s1o3}

Nent = 858 Mean = 0.0341 RMS = 0.4763 Under = 0 Over = 0 Integ = 858

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-4_{dpedHist_s1o4}

Nent = 1066 Mean = -0.4083 RMS = 0.4465 Under = 0 Over = 0 Integ = 1066

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-5_{dpedHist_s1o5}

Nent = 1136 Mean = -0.3848 RMS = 0.3752 Under = 0 Over = 0 Integ = 1136

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-6_{dpedHist_s1o6}

Nent = 866 Mean = -0.5408 RMS = 0.6508 Under = 0 Over = 0 Integ = 866

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-7_{dpedHist_s1o7}

Nent = 1106 Mean = -0.5159 RMS = 0.4995 Under = 0 Over = 0 Integ = 1106