-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-0_{dpedHist_s2o0}

Nent = 1274 Mean = 0.3718 RMS = 0.8112 Under = 0 Over = 0 Integ = 1274

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-1_{dpedHist_s2o1}

Nent = 1266 Mean = 0.1177 RMS = 1.148 Under = 0 Over = 1 Integ = 1265

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-2_{dpedHist_s2o2}

Nent = 1279 Mean = 0.06953 RMS = 0.7439 Under = 0 Over = 0 Integ = 1279

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-3_{dpedHist_s2o3}

Nent = 1275 Mean = 0.1368 RMS = 1.121 Under = 0 Over = 0 Integ = 1275

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-4_{dpedHist_s2o4}

Nent = 1276 Mean = 0.03861 RMS = 0.5926 Under = 0 Over = 0 Integ = 1276

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-5_{dpedHist_s2o5}

Nent = 1270 Mean = 0.04885 RMS = 4.154 Under = 0 Over = 3 Integ = 1267

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-6_{dpedHist_s2o6}

Nent = 1277 Mean = -0.005157 RMS = 3.778 Under = 0 Over = 1 Integ = 1276

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-7_{dpedHist_s2o7}

Nent = 1276 Mean = 0.1438 RMS = 0.5724 Under = 0 Over = 0 Integ = 1276