-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-0_{drmsHist_s2o0}

Nent = 1274 Mean = -0.1182 RMS = 0.2041 Under = 0 Over = 0 Integ = 1274

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-1_{drmsHist_s2o1}

Nent = 1267 Mean = -0.03531 RMS = 0.2297 Under = 0 Over = 0 Integ = 1267

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-2_{drmsHist_s2o2}

Nent = 1279 Mean = -0.05236 RMS = 0.3271 Under = 0 Over = 0 Integ = 1279

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-3_{drmsHist_s2o3}

Nent = 1275 Mean = -0.05695 RMS = 0.2142 Under = 0 Over = 0 Integ = 1275

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-4_{drmsHist_s2o4}

Nent = 1276 Mean = 0.02359 RMS = 0.2258 Under = 0 Over = 0 Integ = 1276

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-5_{drmsHist_s2o5}

Nent = 1271 Mean = 0.03313 RMS = 0.2265 Under = 0 Over = 0 Integ = 1271

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-6_{drmsHist_s2o6}

Nent = 1277 Mean = 0.04222 RMS = 0.1908 Under = 0 Over = 0 Integ = 1277

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-7_{drmsHist_s2o7}

Nent = 1276 Mean = -0.2182 RMS = 0.2573 Under = 0 Over = 0 Integ = 1276