-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-0_{drmsHist_s1o0}

Nent = 1110 Mean = -0.01307 RMS = 0.1679 Under = 0 Over = 0 Integ = 1110

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-1_{drmsHist_s1o1}

Nent = 1137 Mean = 0.0009279 RMS = 0.1192 Under = 0 Over = 0 Integ = 1137

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-2_{drmsHist_s1o2}

Nent = 1113 Mean = 0.03025 RMS = 0.1554 Under = 0 Over = 0 Integ = 1113

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-3_{drmsHist_s1o3}

Nent = 1114 Mean = 0.0139 RMS = 0.1637 Under = 0 Over = 0 Integ = 1114

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-4_{drmsHist_s1o4}

Nent = 1104 Mean = 0.02564 RMS = 0.1151 Under = 0 Over = 0 Integ = 1104

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-5_{drmsHist_s1o5}

Nent = 1145 Mean = -0.03534 RMS = 0.1143 Under = 124 Over = 0 Integ = 1021

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-6_{drmsHist_s1o6}

Nent = 1110 Mean = -0.1137 RMS = 0.1707 Under = 0 Over = 0 Integ = 1110

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-7_{drmsHist_s1o7}

Nent = 1123 Mean = 0.02107 RMS = 0.1341 Under = 0 Over = 0 Integ = 1123