-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-0_{drmsHist_s1o0}

Nent = 1087 Mean = 0.01394 RMS = 0.1305 Under = 0 Over = 0 Integ = 1087

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-1_{drmsHist_s1o1}

Nent = 1129 Mean = -0.005475 RMS = 0.1308 Under = 0 Over = 0 Integ = 1129

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-2_{drmsHist_s1o2}

Nent = 1106 Mean = -0.06049 RMS = 0.1215 Under = 0 Over = 1 Integ = 1105

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-3_{drmsHist_s1o3}

Nent = 1093 Mean = 0.05989 RMS = 0.1734 Under = 0 Over = 0 Integ = 1093

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-4_{drmsHist_s1o4}

Nent = 1077 Mean = -0.02698 RMS = 0.1541 Under = 0 Over = 0 Integ = 1077

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-5_{drmsHist_s1o5}

Nent = 1134 Mean = 0.002101 RMS = 0.1093 Under = 0 Over = 0 Integ = 1134

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-6_{drmsHist_s1o6}

Nent = 1100 Mean = -0.05761 RMS = 0.1226 Under = 0 Over = 0 Integ = 1100

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-7_{drmsHist_s1o7}

Nent = 1082 Mean = -0.08522 RMS = 0.1872 Under = 0 Over = 0 Integ = 1082