-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-0_{drmsHist_s2o0}

Nent = 1263 Mean = 0.1074 RMS = 0.2109 Under = 0 Over = 0 Integ = 1263

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-1_{drmsHist_s2o1}

Nent = 1250 Mean = -0.02884 RMS = 0.3124 Under = 0 Over = 0 Integ = 1250

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-2_{drmsHist_s2o2}

Nent = 1268 Mean = 0.112 RMS = 0.2958 Under = 0 Over = 0 Integ = 1268

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-3_{drmsHist_s2o3}

Nent = 1266 Mean = 0.0627 RMS = 0.3269 Under = 0 Over = 1 Integ = 1265

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-4_{drmsHist_s2o4}

Nent = 1265 Mean = -0.03025 RMS = 0.2808 Under = 0 Over = 0 Integ = 1265

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-5_{drmsHist_s2o5}

Nent = 1259 Mean = 0.2266 RMS = 0.3462 Under = 0 Over = 0 Integ = 1259

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-6_{drmsHist_s2o6}

Nent = 1265 Mean = 0.09395 RMS = 0.2459 Under = 0 Over = 0 Integ = 1265

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-7_{drmsHist_s2o7}

Nent = 1259 Mean = 0.1647 RMS = 0.3553 Under = 0 Over = 0 Integ = 1259