-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-0_{dpedHist_s2o0}

Nent = 1263 Mean = -0.1137 RMS = 0.6211 Under = 0 Over = 0 Integ = 1263

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-1_{dpedHist_s2o1}

Nent = 1250 Mean = 0.06698 RMS = 0.8595 Under = 0 Over = 1 Integ = 1249

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-2_{dpedHist_s2o2}

Nent = 1268 Mean = -0.3044 RMS = 0.7644 Under = 2 Over = 0 Integ = 1266

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-3_{dpedHist_s2o3}

Nent = 1266 Mean = -0.3532 RMS = 0.68 Under = 0 Over = 0 Integ = 1266

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-4_{dpedHist_s2o4}

Nent = 1265 Mean = -0.01345 RMS = 1.164 Under = 0 Over = 0 Integ = 1265

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-5_{dpedHist_s2o5}

Nent = 1259 Mean = -0.02939 RMS = 4.134 Under = 0 Over = 0 Integ = 1259

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-6_{dpedHist_s2o6}

Nent = 1265 Mean = -0.001636 RMS = 3.929 Under = 0 Over = 0 Integ = 1265

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-7_{dpedHist_s2o7}

Nent = 1259 Mean = -0.03888 RMS = 0.6292 Under = 0 Over = 0 Integ = 1259