-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-0_{dpedHist_s1o0}

Nent = 1087 Mean = -0.3249 RMS = 0.3773 Under = 0 Over = 0 Integ = 1087

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-1_{dpedHist_s1o1}

Nent = 1129 Mean = -0.06086 RMS = 0.3721 Under = 0 Over = 0 Integ = 1129

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-2_{dpedHist_s1o2}

Nent = 1106 Mean = -0.293 RMS = 0.3994 Under = 0 Over = 0 Integ = 1106

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-3_{dpedHist_s1o3}

Nent = 1092 Mean = -0.2123 RMS = 0.3002 Under = 0 Over = 0 Integ = 1092

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-4_{dpedHist_s1o4}

Nent = 1076 Mean = -0.09643 RMS = 0.3312 Under = 0 Over = 0 Integ = 1076

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-5_{dpedHist_s1o5}

Nent = 1134 Mean = -0.3026 RMS = 0.3796 Under = 0 Over = 0 Integ = 1134

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-6_{dpedHist_s1o6}

Nent = 1100 Mean = -0.1327 RMS = 0.398 Under = 0 Over = 0 Integ = 1100

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-7_{dpedHist_s1o7}

Nent = 1082 Mean = -0.2173 RMS = 0.3581 Under = 0 Over = 0 Integ = 1082