-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-0_{dpedHist_s2o0}

Nent = 1262 Mean = -0.4516 RMS = 0.6306 Under = 0 Over = 0 Integ = 1262

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-1_{dpedHist_s2o1}

Nent = 1254 Mean = -0.1297 RMS = 0.7581 Under = 0 Over = 0 Integ = 1254

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-2_{dpedHist_s2o2}

Nent = 1269 Mean = -0.5853 RMS = 0.7455 Under = 0 Over = 0 Integ = 1269

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-3_{dpedHist_s2o3}

Nent = 1266 Mean = -0.4849 RMS = 0.6979 Under = 0 Over = 0 Integ = 1266

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-4_{dpedHist_s2o4}

Nent = 1266 Mean = -0.5631 RMS = 0.6866 Under = 0 Over = 0 Integ = 1266

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-5_{dpedHist_s2o5}

Nent = 1260 Mean = -0.6341 RMS = 0.7573 Under = 0 Over = 0 Integ = 1260

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-6_{dpedHist_s2o6}

Nent = 1263 Mean = -0.1783 RMS = 0.9368 Under = 0 Over = 0 Integ = 1263

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-7_{dpedHist_s2o7}

Nent = 1261 Mean = -0.2686 RMS = 0.7034 Under = 0 Over = 0 Integ = 1261