-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-0_{drmsHist_s1o0}

Nent = 1098 Mean = -0.01062 RMS = 0.1812 Under = 9 Over = 0 Integ = 1089

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-1_{drmsHist_s1o1}

Nent = 1128 Mean = 0.07886 RMS = 0.3241 Under = 0 Over = 0 Integ = 1128

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-2_{drmsHist_s1o2}

Nent = 1107 Mean = 0.5412 RMS = 0.8724 Under = 0 Over = 8 Integ = 1099

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-3_{drmsHist_s1o3}

Nent = 1108 Mean = -0.04821 RMS = 0.1865 Under = 0 Over = 0 Integ = 1108

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-4_{drmsHist_s1o4}

Nent = 1079 Mean = -0.02812 RMS = 0.1466 Under = 0 Over = 0 Integ = 1079

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-5_{drmsHist_s1o5}

Nent = 1135 Mean = -0.1902 RMS = 0.1953 Under = 0 Over = 0 Integ = 1135

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-6_{drmsHist_s1o6}

Nent = 1108 Mean = 0.08927 RMS = 0.1796 Under = 0 Over = 0 Integ = 1108

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-7_{drmsHist_s1o7}

Nent = 1107 Mean = -0.09973 RMS = 0.2725 Under = 3 Over = 0 Integ = 1104