-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-0_{drmsHist_s2o0}

Nent = 1274 Mean = 0.1253 RMS = 0.2537 Under = 0 Over = 8 Integ = 1266

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-1_{drmsHist_s2o1}

Nent = 1267 Mean = 0.4471 RMS = 1.025 Under = 0 Over = 29 Integ = 1238

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-2_{drmsHist_s2o2}

Nent = 1279 Mean = -0.08558 RMS = 0.3458 Under = 1 Over = 6 Integ = 1272

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-3_{drmsHist_s2o3}

Nent = 1275 Mean = 0.2336 RMS = 0.4838 Under = 0 Over = 22 Integ = 1253

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-4_{drmsHist_s2o4}

Nent = 1276 Mean = 0.1444 RMS = 0.296 Under = 0 Over = 6 Integ = 1270

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-5_{drmsHist_s2o5}

Nent = 1270 Mean = 0.0343 RMS = 0.2694 Under = 0 Over = 3 Integ = 1267

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-6_{drmsHist_s2o6}

Nent = 1277 Mean = -0.0581 RMS = 0.3122 Under = 0 Over = 8 Integ = 1269

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-7_{drmsHist_s2o7}

Nent = 1276 Mean = -0.1966 RMS = 0.3526 Under = 0 Over = 3 Integ = 1273