-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-0_{drmsHist_s2o0}

Nent = 1262 Mean = 0.1887 RMS = 0.2195 Under = 0 Over = 0 Integ = 1262

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-1_{drmsHist_s2o1}

Nent = 1254 Mean = 0.08277 RMS = 0.1672 Under = 0 Over = 0 Integ = 1254

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-2_{drmsHist_s2o2}

Nent = 1269 Mean = -0.05509 RMS = 0.2822 Under = 0 Over = 0 Integ = 1269

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-3_{drmsHist_s2o3}

Nent = 1266 Mean = -0.1502 RMS = 0.3001 Under = 0 Over = 0 Integ = 1266

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-4_{drmsHist_s2o4}

Nent = 1266 Mean = 0.1033 RMS = 0.2372 Under = 0 Over = 0 Integ = 1266

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-5_{drmsHist_s2o5}

Nent = 1260 Mean = -0.1707 RMS = 0.2062 Under = 0 Over = 0 Integ = 1260

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-6_{drmsHist_s2o6}

Nent = 1263 Mean = 0.2174 RMS = 0.2976 Under = 0 Over = 0 Integ = 1263

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-7_{drmsHist_s2o7}

Nent = 1261 Mean = 0.0642 RMS = 0.2894 Under = 0 Over = 0 Integ = 1261