-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-0_{drmsHist_s1o0}

Nent = 1088 Mean = 0.08933 RMS = 0.2045 Under = 0 Over = 1 Integ = 1087

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-1_{drmsHist_s1o1}

Nent = 1132 Mean = 0.01753 RMS = 0.1381 Under = 0 Over = 0 Integ = 1132

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-2_{drmsHist_s1o2}

Nent = 1106 Mean = -0.2453 RMS = 0.2991 Under = 0 Over = 0 Integ = 1106

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-3_{drmsHist_s1o3}

Nent = 1096 Mean = 0.07115 RMS = 0.1927 Under = 0 Over = 0 Integ = 1096

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-4_{drmsHist_s1o4}

Nent = 1077 Mean = 0.06689 RMS = 0.1259 Under = 0 Over = 0 Integ = 1077

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-5_{drmsHist_s1o5}

Nent = 1134 Mean = 0.1425 RMS = 0.1394 Under = 0 Over = 0 Integ = 1134

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-6_{drmsHist_s1o6}

Nent = 1100 Mean = 0.1097 RMS = 0.2076 Under = 0 Over = 0 Integ = 1100

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-7_{drmsHist_s1o7}

Nent = 1082 Mean = 0.07125 RMS = 0.1583 Under = 0 Over = 0 Integ = 1082