-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-0_{dpedHist_s1o0}

Nent = 1086 Mean = 0.1077 RMS = 0.328 Under = 0 Over = 0 Integ = 1086

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-1_{dpedHist_s1o1}

Nent = 1129 Mean = 0.06772 RMS = 0.3511 Under = 0 Over = 0 Integ = 1129

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-2_{dpedHist_s1o2}

Nent = 1106 Mean = -0.07252 RMS = 0.5957 Under = 0 Over = 0 Integ = 1106

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-3_{dpedHist_s1o3}

Nent = 1092 Mean = -0.03018 RMS = 0.2722 Under = 0 Over = 0 Integ = 1092

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-4_{dpedHist_s1o4}

Nent = 1075 Mean = -0.03778 RMS = 0.3091 Under = 0 Over = 0 Integ = 1075

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-5_{dpedHist_s1o5}

Nent = 1134 Mean = -0.00389 RMS = 0.3122 Under = 0 Over = 0 Integ = 1134

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-6_{dpedHist_s1o6}

Nent = 1100 Mean = -0.2245 RMS = 0.372 Under = 0 Over = 0 Integ = 1100

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-7_{dpedHist_s1o7}

Nent = 1081 Mean = 0.1808 RMS = 0.3247 Under = 0 Over = 0 Integ = 1081