-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-0_{drmsHist_s2o0}

Nent = 1262 Mean = -0.008594 RMS = 0.2257 Under = 0 Over = 0 Integ = 1262

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-1_{drmsHist_s2o1}

Nent = 1255 Mean = 0.1262 RMS = 0.3321 Under = 0 Over = 0 Integ = 1255

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-2_{drmsHist_s2o2}

Nent = 1269 Mean = 0.3222 RMS = 0.3789 Under = 0 Over = 0 Integ = 1269

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-3_{drmsHist_s2o3}

Nent = 1266 Mean = 0.1391 RMS = 0.2854 Under = 0 Over = 0 Integ = 1266

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-4_{drmsHist_s2o4}

Nent = 1266 Mean = 0.09528 RMS = 0.2387 Under = 0 Over = 0 Integ = 1266

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-5_{drmsHist_s2o5}

Nent = 1261 Mean = 0.1736 RMS = 0.279 Under = 0 Over = 0 Integ = 1261

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-6_{drmsHist_s2o6}

Nent = 1265 Mean = 0.653 RMS = 0.6525 Under = 0 Over = 0 Integ = 1265

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-7_{drmsHist_s2o7}

Nent = 1261 Mean = 0.4733 RMS = 0.6536 Under = 0 Over = 16 Integ = 1245