-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-0_{dpedHist_s1o0}

Nent = 1086 Mean = 0.02708 RMS = 0.3457 Under = 0 Over = 0 Integ = 1086

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-1_{dpedHist_s1o1}

Nent = 1129 Mean = 0.03622 RMS = 0.2674 Under = 0 Over = 0 Integ = 1129

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-2_{dpedHist_s1o2}

Nent = 1106 Mean = 0.1105 RMS = 1.227 Under = 0 Over = 0 Integ = 1106

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-3_{dpedHist_s1o3}

Nent = 1092 Mean = -0.008592 RMS = 0.3589 Under = 0 Over = 0 Integ = 1092

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-4_{dpedHist_s1o4}

Nent = 1075 Mean = 0.004892 RMS = 0.3682 Under = 0 Over = 0 Integ = 1075

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-5_{dpedHist_s1o5}

Nent = 1134 Mean = -0.05413 RMS = 0.2813 Under = 0 Over = 0 Integ = 1134

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-6_{dpedHist_s1o6}

Nent = 1100 Mean = 0.03047 RMS = 0.2932 Under = 0 Over = 0 Integ = 1100

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-7_{dpedHist_s1o7}

Nent = 1081 Mean = 0.0466 RMS = 0.3298 Under = 0 Over = 0 Integ = 1081