-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-0_{drmsHist_s2o0}

Nent = 1263 Mean = 0.03448 RMS = 0.1352 Under = 0 Over = 0 Integ = 1263

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-1_{drmsHist_s2o1}

Nent = 1255 Mean = 0.06763 RMS = 0.183 Under = 0 Over = 0 Integ = 1255

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-2_{drmsHist_s2o2}

Nent = 1269 Mean = 0.02967 RMS = 0.2073 Under = 0 Over = 0 Integ = 1269

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-3_{drmsHist_s2o3}

Nent = 1266 Mean = 0.1788 RMS = 0.2204 Under = 0 Over = 0 Integ = 1266

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-4_{drmsHist_s2o4}

Nent = 1266 Mean = 0.03122 RMS = 0.1604 Under = 0 Over = 0 Integ = 1266

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-5_{drmsHist_s2o5}

Nent = 1261 Mean = -0.02865 RMS = 0.2196 Under = 0 Over = 0 Integ = 1261

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-6_{drmsHist_s2o6}

Nent = 1265 Mean = -0.03791 RMS = 0.1559 Under = 0 Over = 0 Integ = 1265

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-7_{drmsHist_s2o7}

Nent = 1261 Mean = 0.02219 RMS = 0.1799 Under = 0 Over = 0 Integ = 1261