-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-0_{drmsHist_s1o0}

Nent = 1110 Mean = 0.04979 RMS = 0.1482 Under = 0 Over = 0 Integ = 1110

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-1_{drmsHist_s1o1}

Nent = 1137 Mean = 0.03646 RMS = 0.1618 Under = 0 Over = 0 Integ = 1137

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-2_{drmsHist_s1o2}

Nent = 1113 Mean = -0.0821 RMS = 0.1912 Under = 0 Over = 0 Integ = 1113

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-3_{drmsHist_s1o3}

Nent = 1113 Mean = -0.003372 RMS = 0.1584 Under = 0 Over = 0 Integ = 1113

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-4_{drmsHist_s1o4}

Nent = 1103 Mean = -0.04199 RMS = 0.1156 Under = 0 Over = 0 Integ = 1103

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-5_{drmsHist_s1o5}

Nent = 1143 Mean = -0.001211 RMS = 0.1116 Under = 0 Over = 0 Integ = 1143

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-6_{drmsHist_s1o6}

Nent = 1110 Mean = 0.03466 RMS = 0.1287 Under = 0 Over = 0 Integ = 1110

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-7_{drmsHist_s1o7}

Nent = 1123 Mean = -0.001745 RMS = 0.1224 Under = 0 Over = 0 Integ = 1123