-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-0_{drmsHist_s2o0}

Nent = 1262 Mean = -0.3138 RMS = 0.3683 Under = 0 Over = 0 Integ = 1262

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-1_{drmsHist_s2o1}

Nent = 1254 Mean = -0.1926 RMS = 0.2763 Under = 1 Over = 0 Integ = 1253

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-2_{drmsHist_s2o2}

Nent = 1269 Mean = -0.1059 RMS = 0.3718 Under = 0 Over = 0 Integ = 1269

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-3_{drmsHist_s2o3}

Nent = 1266 Mean = -0.0824 RMS = 0.2363 Under = 0 Over = 0 Integ = 1266

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-4_{drmsHist_s2o4}

Nent = 1266 Mean = -0.009264 RMS = 0.193 Under = 0 Over = 0 Integ = 1266

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-5_{drmsHist_s2o5}

Nent = 1260 Mean = 0.08806 RMS = 0.1786 Under = 0 Over = 0 Integ = 1260

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-6_{drmsHist_s2o6}

Nent = 1263 Mean = -0.2437 RMS = 0.3432 Under = 1 Over = 0 Integ = 1262

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-7_{drmsHist_s2o7}

Nent = 1261 Mean = -0.1544 RMS = 0.3972 Under = 0 Over = 0 Integ = 1261