-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-0_{drmsHist_s1o0}

Nent = 1086 Mean = -0.09007 RMS = 0.2208 Under = 0 Over = 0 Integ = 1086

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-1_{drmsHist_s1o1}

Nent = 1127 Mean = -0.05265 RMS = 0.1364 Under = 0 Over = 0 Integ = 1127

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-2_{drmsHist_s1o2}

Nent = 1106 Mean = -0.02886 RMS = 0.2267 Under = 1 Over = 1 Integ = 1104

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-3_{drmsHist_s1o3}

Nent = 1092 Mean = 0.08539 RMS = 0.1833 Under = 0 Over = 0 Integ = 1092

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-4_{drmsHist_s1o4}

Nent = 1071 Mean = 0.07927 RMS = 0.1536 Under = 0 Over = 0 Integ = 1071

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-5_{drmsHist_s1o5}

Nent = 1134 Mean = -0.004443 RMS = 0.1323 Under = 0 Over = 0 Integ = 1134

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-6_{drmsHist_s1o6}

Nent = 1100 Mean = -0.06484 RMS = 0.137 Under = 0 Over = 0 Integ = 1100

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-7_{drmsHist_s1o7}

Nent = 1080 Mean = -0.01697 RMS = 0.1194 Under = 0 Over = 0 Integ = 1080