-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-0_{dpedHist_s1o0}

Nent = 1111 Mean = -0.08863 RMS = 0.4035 Under = 0 Over = 0 Integ = 1111

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-1_{dpedHist_s1o1}

Nent = 1137 Mean = 0.1113 RMS = 0.4154 Under = 0 Over = 0 Integ = 1137

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-2_{dpedHist_s1o2}

Nent = 1114 Mean = 0.409 RMS = 0.4678 Under = 0 Over = 0 Integ = 1114

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-3_{dpedHist_s1o3}

Nent = 1113 Mean = -0.3695 RMS = 0.6699 Under = 0 Over = 0 Integ = 1113

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-4_{dpedHist_s1o4}

Nent = 1103 Mean = -0.1847 RMS = 0.3935 Under = 0 Over = 0 Integ = 1103

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-5_{dpedHist_s1o5}

Nent = 1145 Mean = -0.1926 RMS = 0.3166 Under = 0 Over = 0 Integ = 1145

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-6_{dpedHist_s1o6}

Nent = 1110 Mean = -0.1345 RMS = 0.3592 Under = 0 Over = 0 Integ = 1110

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-7_{dpedHist_s1o7}

Nent = 1123 Mean = -0.05361 RMS = 0.3307 Under = 0 Over = 0 Integ = 1123