-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-0_{dpedHist_s2o0}

Nent = 1274 Mean = -0.09735 RMS = 0.6432 Under = 0 Over = 0 Integ = 1274

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-1_{dpedHist_s2o1}

Nent = 1269 Mean = 0.6338 RMS = 0.8615 Under = 0 Over = 0 Integ = 1269

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-2_{dpedHist_s2o2}

Nent = 1280 Mean = -0.2421 RMS = 0.8885 Under = 0 Over = 0 Integ = 1280

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-3_{dpedHist_s2o3}

Nent = 1275 Mean = 0.04542 RMS = 0.6627 Under = 0 Over = 0 Integ = 1275

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-4_{dpedHist_s2o4}

Nent = 1277 Mean = -0.008894 RMS = 0.7179 Under = 0 Over = 0 Integ = 1277

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-5_{dpedHist_s2o5}

Nent = 1271 Mean = 0.2534 RMS = 0.6023 Under = 0 Over = 0 Integ = 1271

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-6_{dpedHist_s2o6}

Nent = 1278 Mean = -0.1261 RMS = 0.801 Under = 0 Over = 0 Integ = 1278

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-7_{dpedHist_s2o7}

Nent = 1277 Mean = -0.1041 RMS = 0.6581 Under = 0 Over = 0 Integ = 1277