-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-0_{dpedHist_s2o0}

Nent = 1263 Mean = -0.04696 RMS = 0.5512 Under = 0 Over = 0 Integ = 1263

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-1_{dpedHist_s2o1}

Nent = 1255 Mean = -0.3333 RMS = 0.7186 Under = 0 Over = 0 Integ = 1255

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-2_{dpedHist_s2o2}

Nent = 1269 Mean = 0.05252 RMS = 0.7147 Under = 0 Over = 0 Integ = 1269

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-3_{dpedHist_s2o3}

Nent = 1266 Mean = 0.003773 RMS = 0.5321 Under = 0 Over = 0 Integ = 1266

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-4_{dpedHist_s2o4}

Nent = 1266 Mean = -0.0004029 RMS = 0.5156 Under = 0 Over = 0 Integ = 1266

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-5_{dpedHist_s2o5}

Nent = 1261 Mean = -0.07333 RMS = 0.645 Under = 0 Over = 0 Integ = 1261

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-6_{dpedHist_s2o6}

Nent = 1265 Mean = -0.4171 RMS = 1.283 Under = 0 Over = 0 Integ = 1265

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-7_{dpedHist_s2o7}

Nent = 1261 Mean = -0.002701 RMS = 0.7418 Under = 0 Over = 0 Integ = 1261