-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-0_{drmsHist_s1o0}

Nent = 1085 Mean = 0.02479 RMS = 0.1484 Under = 0 Over = 0 Integ = 1085

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-1_{drmsHist_s1o1}

Nent = 1127 Mean = -0.0474 RMS = 0.1523 Under = 0 Over = 0 Integ = 1127

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-2_{drmsHist_s1o2}

Nent = 1106 Mean = 0.07877 RMS = 0.2279 Under = 1 Over = 2 Integ = 1103

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-3_{drmsHist_s1o3}

Nent = 1092 Mean = -0.218 RMS = 0.384 Under = 0 Over = 0 Integ = 1092

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-4_{drmsHist_s1o4}

Nent = 1071 Mean = 0.00307 RMS = 0.1303 Under = 0 Over = 0 Integ = 1071

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-5_{drmsHist_s1o5}

Nent = 1134 Mean = 0.03541 RMS = 0.1197 Under = 0 Over = 0 Integ = 1134

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-6_{drmsHist_s1o6}

Nent = 1100 Mean = -0.0189 RMS = 0.141 Under = 0 Over = 0 Integ = 1100

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-7_{drmsHist_s1o7}

Nent = 1080 Mean = 0.02643 RMS = 0.1154 Under = 0 Over = 0 Integ = 1080