-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-0_{drmsHist_s2o0}

Nent = 1274 Mean = -0.1258 RMS = 0.2175 Under = 0 Over = 0 Integ = 1274

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-1_{drmsHist_s2o1}

Nent = 1269 Mean = -0.04623 RMS = 0.2362 Under = 0 Over = 0 Integ = 1269

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-2_{drmsHist_s2o2}

Nent = 1280 Mean = 0.001562 RMS = 0.4005 Under = 32 Over = 0 Integ = 1248

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-3_{drmsHist_s2o3}

Nent = 1275 Mean = -0.1448 RMS = 0.2886 Under = 0 Over = 0 Integ = 1275

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-4_{drmsHist_s2o4}

Nent = 1277 Mean = -0.05856 RMS = 0.1782 Under = 0 Over = 0 Integ = 1277

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-5_{drmsHist_s2o5}

Nent = 1271 Mean = 0.07661 RMS = 0.2443 Under = 0 Over = 0 Integ = 1271

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-6_{drmsHist_s2o6}

Nent = 1278 Mean = -0.06667 RMS = 0.3258 Under = 0 Over = 0 Integ = 1278

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-7_{drmsHist_s2o7}

Nent = 1277 Mean = -0.1412 RMS = 0.3667 Under = 0 Over = 0 Integ = 1277